0 0.02

0.04

0.06

0.08 0.1 0.12

0 5 10 15 20

b [fm] dN/db [1/fm]

0 0.2 0.4 0.6 0.8 1

0 5 10 15 20

b [fm] centrality [%]

3.3

neXus 1.02 100 A GeV Au + 100 A GeV Au

0 0.025

0.05

0.075 0.1 0.125

0.15

0.175 0.2

0 2.5 5 7.5 10

b [fm] dN/db [1/fm]

0 0.2 0.4 0.6 0.8 1

0 2.5 5 7.5 10

b [fm] centrality [%]

1.6

neXus 1.02 125 A GeV Si + 125 A GeV Si