ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100 200 300 400

500 600

700 800

Photon Tof 0000239461 W0^{/ ndf2χ 8.608 / 6}

Constant 15.5±

828.5 Mean 0.008 ± -3.736 Sigma 0.0119 ± 0.4177

Photon Tof 0000239461 W0

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

600

Photon Tof 0000239461 W1^{/ ndf2χ 6.365 / 6}

Constant 13.1±

611.9 Mean 0.011 ± -3.662 Sigma 0.0139 ± 0.4167

Photon Tof 0000239461 W1

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

600

700

800 Photon Tof 0000239461 W2^{/ ndf2χ 10.35 / 6}

Constant 14.7±

780.8 Mean 0.01±

-3.75 Sigma 0.0147 ± 0.4516

Photon Tof 0000239461 W2

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

600

700 Photon Tof 0000239461 W3^{/ ndf2χ 3.484 / 6}

Constant 13.7±

682.5 Mean 0.01±

-3.78 Sigma 0.0208 ± 0.5023

Photon Tof 0000239461 W3

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

Photon Tof 0000239461 E2^{/ ndf2χ 9.156 / 6}

Constant 11.4±

505.9 Mean 0.015 ± -3.642 Sigma 0.016 ± 0.423

Photon Tof 0000239461 E2

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

600 Photon Tof 0000239461 E3^{/ ndf2χ 5.925 / 6}

Constant 12.3±

575.6 Mean 0.015 ± -3.684 Sigma 0.0199 ± 0.4743

Photon Tof 0000239461 E3

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

50

100

150

200

250

300

350

400 Photon Tof 0000239461 E0^{/ ndf2χ 4.907 / 6}

Constant 9.7±

385.4 Mean 0.0319 ± 0.4221 Sigma 0.0591 ± 0.6635

Photon Tof 0000239461 E0

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0 50 100 150 200 250 300 350 400 450

Photon Tof 0000239461 E1^{/ ndf2χ 7.593 / 6}

Constant 11.2±

452 Mean 0.0194 ± 0.2872 Sigma 0.0407 ± 0.5891

Photon Tof 0000239461 E1