ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0 100 200 300 400 500 600 700 800 900

Photon Tof 0000239461 W0^{/ ndf2χ 6.053 / 6}

Constant 15.8±

865.4 Mean 0.008 ± -3.724 Sigma 0.0115 ± 0.4166

Photon Tof 0000239461 W0

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

600

700

Photon Tof 0000239461 W1^{/ ndf2χ 15.91 / 6}

Constant 13.6±

649.5 Mean 0.010 ± -3.657 Sigma 0.0129 ± 0.4111

Photon Tof 0000239461 W1

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0 100

200 300 400

500

600

700 800

Photon Tof 0000239461 W2^{/ ndf2χ 3.902 / 6}

Constant 15.3±

831.7 Mean 0.01±

-3.76 Sigma 0.0143 ± 0.4508

Photon Tof 0000239461 W2

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

600

700

Photon Tof 0000239461 W3^{/ ndf2χ 2.627 / 6}

Constant 14.3±

750.7 Mean 0.012 ± -3.757 Sigma 0.0193 ± 0.4981

Photon Tof 0000239461 W3

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

Photon Tof 0000239461 E2^{/ ndf2χ 9.895 / 6}

Constant 12.1±

547.2 Mean 0.013 ± -3.687 Sigma 0.0162 ± 0.4336

Photon Tof 0000239461 E2

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

600

Photon Tof 0000239461 E3^{/ ndf2χ 9.045 / 6}

Constant 12.7±

606.4 Mean 0.016 ± -3.679 Sigma 0.0226 ± 0.5012

Photon Tof 0000239461 E3

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

50

100

150

200

250

300

350

400 Photon Tof 0000239461 E0^{/ ndf2χ 4.907 / 6}

Constant 9.7±

385.4 Mean 0.0319 ± 0.4221 Sigma 0.0591 ± 0.6635

Photon Tof 0000239461 E0

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0 50 100 150 200 250 300 350 400 450

Photon Tof 0000239461 E1^{/ ndf2χ 7.593 / 6}

Constant 11.2±

452 Mean 0.0194 ± 0.2872 Sigma 0.0407 ± 0.5891

Photon Tof 0000239461 E1