ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

600

Photon Tof 0000239461 W0^{/ ndf2χ 2.031 / 6}

Constant 13.4± 640.7 Mean 0.0096999 ± 0.0005786 Sigma 0.0134±

0.4201

Photon Tof 0000239461 W0

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

600 Photon Tof 0000239461 W1^{/ ndf2χ 5.193 / 6}

Constant 12.6±

559.1 Mean 0.01048 ± -0.02632 Sigma 0.0155 ± 0.4332

Photon Tof 0000239461 W1

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

600

Photon Tof 0000239461 W2^{/ ndf2χ 2.072 / 6}

Constant 12.7±

584.4 Mean 0.011162 ± 0.001208 Sigma 0.0162 ± 0.4453

Photon Tof 0000239461 W2

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0 50

100 150 200 250

300 350 400

450 Photon Tof 0000239461 W3^{/ ndf2χ 4.503 / 6}

Constant 10.7±

410.2 Mean 0.014448 ± -0.003777 Sigma 0.0222 ± 0.4659

Photon Tof 0000239461 W3

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500

Photon Tof 0000239461 E2^{/ ndf2χ 7.109 / 6}

Constant 12.0±

507.9 Mean 0.010518 ± -0.002329 Sigma 0.0141 ± 0.4085

Photon Tof 0000239461 E2

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

100

200

300

400

500 Photon Tof 0000239461 E3^{/ ndf2χ 13.19 / 6}

Constant 11.7±

469.5 Mean 0.01340 ± 0.01787 Sigma 0.0224 ± 0.4753

Photon Tof 0000239461 E3

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0 20 40 60 80

100 120 140 160 180 Photon Tof 0000239461 E0^{/ ndf2χ 13.25 / 6}

Constant 6.0±

156 Mean 0.026787 ± -0.008607 Sigma 0.0421 ± 0.5277

Photon Tof 0000239461 E0

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0 20 40 60 80 100 120 140 160 180 200

Photon Tof 0000239461 E1^{/ ndf2χ 4.407 / 6}

Constant 7.6± 205.3 Mean 0.0214890 ± 0.0004308 Sigma 0.0334±

0.4736

Photon Tof 0000239461 E1