/ ndf

2χ 4.858 / 6

Constant 6.5±

148.9

Mean 0.0236 ± 0.0599

Sigma 0.0387 ± 0.4766

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

20

40

60

80

100

120

140

160

180

200 3 10×

Tof All Sectors

2χ 95.25 / 4

Constant 257±

1.92e+05

Mean 0.0009 ± 0.1326

Sigma 0.0016 ± 0.4508

/ ndf

2χ 4.858 / 6

Constant 6.5±

148.9

Mean 0.0236 ± 0.0599

Sigma 0.0387 ± 0.4766

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

20

40

60

80

100

120

140

160 3 10×

Tof PbSc Sectors

2χ 108.8 / 4

Constant 236±

1.6e+05

Mean 0.0009 ± 0.1382

Sigma 0.0016 ± 0.4346

/ ndf

2χ 1.801 / 6

Constant 4.99±

92.89

Mean 0.05969 ± 0.04037

Sigma 0.1464 ± 0.7074

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

5000

Tof PbGl Sectors

2χ 8.424 / 4

Constant 105±

3.196e+04

Mean 0.00310 ± 0.08373

Sigma 0.0080 ± 0.5771