/ ndf

2χ 7.418 / 6

Constant 5.7±

130

Mean 0.0421 ± 0.1475

Sigma 0.0461 ± 0.4809

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

20

40

60

80

100

120

140 3 10×

Tof All Sectors

2χ 106 / 4

Constant 219±

1.385e+05

Mean 0.001 ± 0.135

Sigma 0.0017 ± 0.4347

/ ndf

2χ 7.418 / 6

Constant 5.7±

130

Mean 0.0421 ± 0.1475

Sigma 0.0461 ± 0.4809

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

20

40

60

80

100

120

3 10×

Tof PbSc Sectors

2χ 137 / 4

Constant 206±

1.217e+05

Mean 0.0010 ± 0.1402

Sigma 0.0017 ± 0.4228

/ ndf

2χ 6.997 / 6

Constant 3.22±

40.93

Mean 0.1183 ± 0.1091

Sigma 0.2128 ± 0.6938

-10 -8 -6 -4 -2 0 2 4 6 8 10 0

2000

4000

6000

8000

Tof PbGl Sectors

2χ 5.384 / 4

Constant 77±

1.691e+04

Mean 0.00387 ± 0.07377

Sigma 0.0097 ± 0.5509