ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

50

100

150

200

250

300

350

Photon Tof 0000230171 W0^{/ ndf2χ 6.778 / 6}

Constant 9.3±

355.4 Mean 0.0270 ± -0.1337 Sigma 0.0349 ± 0.5332

Photon Tof 0000230171 W0

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

50

100

150

200

250

300

Photon Tof 0000230171 W1^{/ ndf2χ 0.4539 / 6}

Constant 9.6±

327.4 Mean 0.0135 ± -0.2038 Sigma 0.0199 ± 0.4307

Photon Tof 0000230171 W1

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

50

100

150

200

250

300

350

Photon Tof 0000230171 W2^{/ ndf2χ 9.138 / 6}

Constant 9.7±

333.7 Mean 0.016 ± -0.193 Sigma 0.0265 ± 0.4808

Photon Tof 0000230171 W2

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0 20 40 60 80 100 120 140 160 180 200 220

Photon Tof 0000230171 W3^{/ ndf2χ 1.014 / 6}

Constant 7.7±

219 Mean 0.0284 ± -0.2377 Sigma 0.0556 ± 0.5848

Photon Tof 0000230171 W3

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

50

100

150

200

250

300

Photon Tof 0000230171 E2^{/ ndf2χ 8.659 / 6}

Constant 8.5±

264.4 Mean 0.0230 ± -0.3056 Sigma 0.034 ± 0.496

Photon Tof 0000230171 E2

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

50

100

150

200

250

300

Photon Tof 0000230171 E3^{/ ndf2χ 4.473 / 6}

Constant 9.0±

292.4 Mean 0.0182 ± -0.1392 Sigma 0.0304 ± 0.4919

Photon Tof 0000230171 E3

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0 10 20 30 40 50 60 70 80 90

Photon Tof 0000230171 E0^{/ ndf2χ 3.716 / 6}

Constant 4.82±

90.39 Mean 0.0440 ± -0.2148 Sigma 0.072 ± 0.551

Photon Tof 0000230171 E0

ToF [ns]

-10 -8 -6 -4 -2 0 2 4 6 8 10 dN/d(ToF)

0

20

40

60

80

100

120

Photon Tof 0000230171 E1^{/ ndf2χ 3.786 / 6}

Constant 5.8±

124.7 Mean 0.0247 ± -0.1616 Sigma 0.0378 ± 0.4646

Photon Tof 0000230171 E1