Resudual

-20 -15 -10 -5 0 5 10 15 20 0

5

10

15

20

25

Res_Fem0_DAC64 Nent = 128 Mean = -0.08638 RMS = 1.627

Residuals for FEM 0, DAC 64 Res_Fem0_DAC64

Resudual

-20 -15 -10 -5 0 5 10 15 20 0 5 10 15 20 25 30 35 Res_Fem1_DAC64 Nent = 128 Mean = 0.7968 RMS = 0.6273

Residuals for FEM 1, DAC 64 Res_Fem1_DAC64

Resudual

-20 -15 -10 -5 0 5 10 15 20 0 5 10 15 20 25 30 35 40 Res_Fem2_DAC64 Nent = 128 Mean = 0.1982 RMS = 0.4791

Residuals for FEM 2, DAC 64_{Res_Fem2_DAC64}

Resudual

-20 -15 -10 -5 0 5 10 15 20 0 5 10 15 20 25 30 35 40 Res_Fem3_DAC64 Nent = 128 Mean = 0.6151 RMS = 0.6382

Residuals for FEM 3, DAC 64_{Res_Fem3_DAC64}

Resudual

-20 -15 -10 -5 0 5 10 15 20 0

10

20

30

40

50 Res_Fem4_DAC64 Nent = 128 Mean = 0.5555 RMS = 0.4707

Residuals for FEM 4, DAC 64 Res_Fem4_DAC64

Resudual

-20 -15 -10 -5 0 5 10 15 20 0 5 10 15 20 25 30 Res_Fem5_DAC64 Nent = 128 Mean = 0.9668 RMS = 0.6762

Residuals for FEM 5, DAC 64 Res_Fem5_DAC64

Resudual

-20 -15 -10 -5 0 5 10 15 20 0

10

20

30

40

50 Res_Fem6_DAC64 Nent = 128 Mean = 0.7257 RMS = 0.6568

Residuals for FEM 6, DAC 64_{Res_Fem6_DAC64}

Resudual

-20 -15 -10 -5 0 5 10 15 20 0 5 10 15 20 25 30 35

Res_Fem7_DAC64 Nent = 128 Mean = 0.1118 RMS = 1.151

Residuals for FEM 7, DAC 64_{Res_Fem7_DAC64}