Resudual

-20 -15 -10 -5 0 5 10 15 20 0

5

10

15

20

25

Res_Fem0_DAC64 Nent = 128 Mean = -0.1751 RMS = 1.137

Residuals for FEM 0, DAC 64 Res_Fem0_DAC64

Resudual

-20 -15 -10 -5 0 5 10 15 20 0 10 20 30 40 50 60

Res_Fem1_DAC64 Nent = 128 Mean = -0.4029 RMS = 1.46

Residuals for FEM 1, DAC 64 Res_Fem1_DAC64

Resudual

-20 -15 -10 -5 0 5 10 15 20 0

10

20

30

40

50 Res_Fem2_DAC64 Nent = 128 Mean = 0.6641 RMS = 0.5339

Residuals for FEM 2, DAC 64_{Res_Fem2_DAC64}

Resudual

-20 -15 -10 -5 0 5 10 15 20 0 5 10 15 20 25 30 35 40 Res_Fem3_DAC64 Nent = 128 Mean = 0.526 RMS = 0.8576

Residuals for FEM 3, DAC 64_{Res_Fem3_DAC64}

Resudual

-20 -15 -10 -5 0 5 10 15 20 0

5

10

15

20

25

Res_Fem4_DAC64 Nent = 128 Mean = 0.07099 RMS = 2.585

Residuals for FEM 4, DAC 64 Res_Fem4_DAC64

Resudual

-20 -15 -10 -5 0 5 10 15 20 0 5 10 15 20 25 30

Res_Fem5_DAC64 Nent = 128 Mean = 1.429 RMS = 1.403

Residuals for FEM 5, DAC 64 Res_Fem5_DAC64

Resudual

-20 -15 -10 -5 0 5 10 15 20 0 5 10 15 20 25 30 35 Res_Fem6_DAC64 Nent = 128 Mean = 1.026 RMS = 0.6172

Residuals for FEM 6, DAC 64_{Res_Fem6_DAC64}

Resudual

-20 -15 -10 -5 0 5 10 15 20 0 5 10 15 20 25 30 35 40 45 Res_Fem7_DAC64 Nent = 128 Mean = 0.3918 RMS = 1.009

Residuals for FEM 7, DAC 64_{Res_Fem7_DAC64}