RACK

3

RACK

2

RACK

1

Oct 2

Id = 0x83

Oct 3

Id = 0x83

Oct 1

Id = 0x6f

Oct 5

Id = 0xbf

Oct 8

Id = 0x5b

Oct 4

Id = 0x83

Sta-1W

Id = 0xee

Oct 7

Id = 0x47

Sta-1E

Id = 0xed

Oct 6

Id = 0x33

Cal

aA

L

Hub

12´

24´

20´

20´

12´ existing

12´

24´

20´

20´

12´

Glink/Clink ArcNet

connections as seen

from back of

magnet.

ArcNet hex address

is indicated.

MJL̆ 11/3/00