Station-1,Qdr-1,Chassis-5, Slave

s1-calib-o1-gap1-14dec-2.dat

channel number

0 20 40 60 80 100 120

RMS of all event

0 1 2 3 4 5 6 7 8 9 10 4cell_128chan_rms Nent = 512 Mean x = 61.56 Mean y = 1.875 RMS x = 36.9 RMS y = 0.982 chan vs rms 4cell_128chan_rms

channel number

0 20 40 60 80 100 120 average adc of all event

0

500

1000

1500

2000

2500

4cell_128chan_avg Nent = 512 Mean x = 63.8 Mean y = 1289 RMS x = 36.95 RMS y = 794.7

chan vs avg_{4cell_128chan_avg}