Muon Workshop

M. Brooks 24-Oct-97

General μTr Soft ware St at us

PISORP code convert ed t o STAF t wice, working on t hird port . VERY init ial port wit h : ZEBRA st ruct ures maint ained code st ill in FORTRAN NTUPLES not put back in yet code not reorganized t o fit int o proposed STAF out line.

Out line for final STAF modules and st ruct ures in draft form

Proposal for pat t ern recognt ion modules in draft form