Date:  November 18, 1997 Sheet of

Size Document Number REV
B

+12V

RPF11

RXE010
R103
4.3K

C60
0.1uF
R107
10
R108
75.0
C53

0.1uF

R109

23.7

                                                                                                14
                                                                                                    13

                                                                                                    12
                                                                                                     Q11E

                                                                                                            4
                                                                                                                3

                                                                                                                2
                                                                                                                Q11B

                                                                                             D33

                                                                                             DL4148
                                                                                                         R100
                                                                                                         8.66K
                                                                          C56

                                                                          0.1uF

                                                                                  R97

                                                                                  33.2

                                      R106
                                    400M
                                    1/2W
                                               C58

                                               2.2nF
                                               6KV

                                                         D31

                                                               1N4934

                                                            D32

                                                                R93
                                                              51.1

               IN12

                                     1
                                     2

                                     J31

          JUMP8

               IN11

                                JUMP6

                                     1
                                     2

                                     J30

                                       R105 400M1/2W

                                               C57

                                               2.2nF
                                               6KV

                                                          R94
                                                       10.0K

                                                                   R95

                                                                   10.0K

                                                                   D36

                                                                   1N4934

                                                                      D34

                                                                                   C51

                                                                                   1.0pF

                                                                                      R98
                                                                                   8.25K

                                                                                               15

                                                                                            16 1
                                                                                                 5

                                                                                              Q11A

                                                                                           CA3127M

                                                                                            C59

                                                                                          0.1uF R99
                                                                                                      16.2K

                                                                                                           D35
                                                                                                         HSMS2800

                                                                                                          R101
                                                                                                          8.25K

                                                                                                                        SUB5

                                                                                                                   8
                                                                                                                       7

                                                                                                                       6
                                                                                                                        Q11C

Q12
2N3906

                                                                                                                   R102
                                                                                                                 8.25K

R104
51.1
R110

10

C54

0.1uF

RPF12

RXE010

                                                                           OUTPUT

1
2

J32

-12V

C55
0.1uF

                                                                                                   SUB5
                                                                   R96

                                                                   1.00K

                                                                             9
                                                                                10

                                                                                1
                                                                                 Q11D
                                                                                 CA3127M

                                            +12V

                                                           C52
                                                           0.1uF
         R113
          1G

                                 R111
                                 51.1

                                     R114
                                     1.00K

          JUMP7

  R112
   1G

   C62
2.2nF
  6KV

                                   C61
                                   2.2nF
                                   6KV

                     R65
                     100K

            R64
           100K

                          PU
                          LS
                          ER

                 HV
                 1

                    HV
                    2

                             VR
                             EF

                J16 J17 J11 J12

       5KV MAX