Muon Rapidity y

-2 -1 0 1 2 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 00-20%

>1.5 GeV/c TP sys coll Nδ

Muon Rapidity y

-2 -1 0 1 2 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 20-40%

← Au → d

PHENIX Preliminary

Muon Rapidity y

-2 -1 0 1 2 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 40-60%