η -2 -1 0 1 2

CPR

0

0.5

1

1.5

2

[0-20%]

Most Central

η -2 -1 0 1 2 0

0.5

1

1.5

[20-40%]

PHENIX Preliminary

η -2 -1 0 1 2 0

0.5

1

1.5

2

[40-60%]

<3 GeV/c t 1<p Au ←

→d