htemp Entries 547 Mean 7.62 RMS 1.616

6 8 10 12 14 0 50 100 150 200 250 300 350 400 mc_pid {abs(pz)>3.0} htemp

Entries 547 Mean 2.91 RMS 0.9681

0 0.5 1 1.5 2 2.5 3 3.5 4 0 20 40 60 80 100 120 140 160 180 200 220 htemp

muid_d_depth {abs(pz)>3.0}

htemp Entries 412 Mean 2.665 RMS 0.9161

0 0.5 1 1.5 2 2.5 3 3.5 4 0 20 40 60 80 100 120 140 160 180 200 muid_d_depth {abs(pz)>3.0&&mc_pid==8} htemp

Entries 105 Mean 3.971 RMS 0.1666

3 3.2 3.4 3.6 3.8 4 0

20

40

60

80

100

htemp

muid_d_depth {abs(pz)>3.0&&mc_pid==5}

htemp Entries 412 Mean -33.52 RMS 44.09

-300 -250 -200 -150 -100 -50 0 50 100 0

50

100

150

200

250 mc_vz {abs(pz)>3.0&&mc_pid==8} htemp

Entries 105 Mean -52.39 RMS 60.17

-300 -250 -200 -150 -100 -50 0 0 1 2 3 4 5 6 7 8 9 htemp

mc_vz {abs(pz)>3.0&&mc_pid==5}