htemp Entries 339 Mean 6.802 RMS 1.915

6 8 10 12 14 0 20 40 60 80 100 120 140 160 180 mc_pid {abs(pz)>3.0} htemp Entries 339 Mean 3.236 RMS 1.006

0 0.5 1 1.5 2 2.5 3 3.5 4 0 20 40 60 80 100 120 140 160 180 200 htemp muid_d_depth {abs(pz)>3.0}

htemp Entries 172 Mean 2.593 RMS 0.975

0 0.5 1 1.5 2 2.5 3 3.5 4 0 10 20 30 40 50 60 70 80

muid_d_depth {abs(pz)>3.0&&mc_pid==8} htemp Entries 155 Mean 4 RMS 0

3 3.5 4 4.5 5 0 20 40 60 80 100 120 140 160 htemp muid_d_depth {abs(pz)>3.0&&mc_pid==5}

htemp Entries 172 Mean -8.488 RMS 27.4

-300 -250 -200 -150 -100 -50 0 50 100 0 20 40 60 80 100 120 140 160 mc_vz {abs(pz)>3.0&&mc_pid==8} htemp Entries 155 Mean -44.16 RMS 52.12

-300 -250 -200 -150 -100 -50 0 0

2

4

6

8

10

htemp mc_vz {abs(pz)>3.0&&mc_pid==5}