htemp Entries 162 Mean 5.444 RMS 1.066

5 5.5 6 6.5 7 7.5 8 0 20 40 60 80 100 120 140 mc_pid {abs(pz)>2.0} htemp Entries 162 Mean 3.543 RMS 0.6768

2 2.5 3 3.5 4 0

20

40

60

80

100 htemp muid_d_depth {abs(pz)>2.0}

htemp Entries 24 Mean 2.833 RMS 0.7993

2 2.5 3 3.5 4 0

2

4

6

8

10 muid_d_depth {abs(pz)>2.0&&mc_pid==8} htemp Entries 138 Mean 3.667 RMS 0.5689

2 2.5 3 3.5 4 0

20

40

60

80

100 htemp muid_d_depth {abs(pz)>2.0&&mc_pid==5}

htemp Entries 24 Mean 0 RMS 0

-1 -0.5 0 0.5 1 0

5

10

15

20

25 mc_vz {abs(pz)>2.0&&mc_pid==8} htemp Entries 138 Mean -34.72 RMS 34.75

-250 -200 -150 -100 -50 0 0

2

4

6

8

10 htemp mc_vz {abs(pz)>2.0&&mc_pid==5}