htemp Entries 1464 Mean 7.954 RMS 1.174

6 8 10 12 14 0

200

400

600

800

1000

1200 mc_pid {abs(pz)>3.0} htemp Entries 1464 Mean 2.819 RMS 0.9441

0 0.5 1 1.5 2 2.5 3 3.5 4 0

100

200

300

400

500

600 htemp muid_d_depth {abs(pz)>3.0}

htemp Entries 1175 Mean 2.729 RMS 0.9253

0 0.5 1 1.5 2 2.5 3 3.5 4 0

100

200

300

400

500 muid_d_depth {abs(pz)>3.0&&mc_pid==8} htemp Entries 116 Mean 4 RMS 0

3 3.5 4 4.5 5 0

20

40

60

80

100

120 htemp muid_d_depth {abs(pz)>3.0&&mc_pid==5}

htemp Entries 1175 Mean -52.97 RMS 47.76

-300 -200 -100 0 100 0 50 100 150 200 250 300 350 400 450 mc_vz {abs(pz)>3.0&&mc_pid==8} htemp Entries 116 Mean -67.53 RMS 65.68

-300 -250 -200 -150 -100 -50 0 0 1 2 3 4 5 6 7 8 htemp mc_vz {abs(pz)>3.0&&mc_pid==5}