htemp Entries 6 Mean 3.311 RMS 0.96

2 2.5 3 3.5 4 4.5 0

0.2

0.4

0.6

0.8

1 ptotus_reco {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)} htemp

Entries 6 Mean 167.8 RMS 40.92

120 140 160 180 200 220 240 0

0.2

0.4

0.6

0.8

1 htemp zvt {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)}

htemp Entries 6 Mean -0.02412 RMS 0.1597

-0.2 -0.1 0 0.1 0.2 0.3 0

0.2

0.4

0.6

0.8

1 ptotus_reco-ptotus_true {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)}

2 2.5 3 3.5 4 4.5 5 2

2.5

3

3.5

4

4.5

ptotus_reco:ptotus_true {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)}

htemp Entries 6 Mean 5 RMS -0

4 4.5 5 5.5 6 0

1

2

3

4

5

6 mc_pid {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)} htemp

Entries 6 Mean 2.667 RMS 7.542

-8 -6 -4 -2 0 2 4 6 8 0 0.5 1 1.5 2 2.5 3 3.5 4 htemp

prnt_pid {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)}