htemp Entries 2 Mean 1.537 RMS 0.0979

1.45 1.5 1.55 1.6 1.65 0

0.2

0.4

0.6

0.8

1 ptotus_reco {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)} htemp

Entries 2 Mean 165.1 RMS 14.9

150 155 160 165 170 175 180 0

0.2

0.4

0.6

0.8

1 htemp

zvt {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)}

htemp Entries 2 Mean 0.07632 RMS 0.07488

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0

0.2

0.4

0.6

0.8

1 ptotus_reco-ptotus_true {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)}

1.44 1.45 1.46 1.47 1.48

1.45

1.5

1.55

1.6

1.65

ptotus_reco:ptotus_true {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)}

htemp Entries 2 Mean 5 RMS -0

4 4.5 5 5.5 6 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 mc_pid {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)} htemp

Entries 2 Mean 8 RMS -0

7 7.5 8 8.5 9 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp

prnt_pid {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4&&ptot_reco<20)}