htemp Entries 43 Mean 7.721 RMS 0.8714

5 5.5 6 6.5 7 7.5 8 0 5 10 15 20 25 30 35 40 mc_pid {recosuc==1&&ptotus_reco>1.5&&road_depth==3} htemp

Entries 43 Mean 1.116 RMS 3.265

-8 -6 -4 -2 0 2 4 6 8 0 5 10 15 20 25 30 35 htemp

prnt_pid {recosuc==1&&ptotus_reco>1.5&&road_depth==3} htemp

Entries 43 Mean 11.46 RMS 28.49

0 20 40 60 80 100 120 0 5 10 15 20 25 30 35

htemp zvt {recosuc==1&&ptotus_reco>1.5&&road_depth==3}

htemp Entries 35 Mean 8 RMS -0

7 7.5 8 8.5 9 0 5 10 15 20 25 30 35 mc_pid {(recosuc==1&&ptotus_reco>1.5&&road_depth==3)&&(zvt==0)} htemp

Entries 3 Mean 5 RMS -0

4 4.5 5 5.5 6 0

0.5 1

1.5

2

2.5 3 htemp

mc_pid {(recosuc==1&&ptotus_reco>1.5&&road_depth==3)&&(zvt>0&&zvt<41)} htemp

Entries 5 Mean 7.4 RMS 1.2

5 5.5 6 6.5 7 7.5 8 0 0.5 1 1.5 2 2.5 3 3.5 4 htemp

mc_pid {(recosuc==1&&ptotus_reco>1.5&&road_depth==3)&&(zvt>41&&zvt<120)}

htemp Entries 3 Mean 2.667 RMS 7.542

-8 -6 -4 -2 0 2 4 6 8 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 prnt_pid {(recosuc==1&&ptotus_reco>1.5&&road_depth==3)&&(zvt>0&&zvt<41)} htemp

Entries 5 Mean 8 RMS -0

7 7.5 8 8.5 9 0

1

2

3

4

5 htemp

prnt_pid {(recosuc==1&&ptotus_reco>1.5&&road_depth==3)&&(zvt>41)}