htemp Entries 772 Mean 0 RMS -0

-1 -0.5 0 0.5 1 0 100 200 300 400 500 600 700 800 zvt {zvt==0&&(mc_pid==8||mc_pid==9)} htemp

Entries 5 Mean 21.84 RMS 11.79

10 15 20 25 30 35 0

0.2

0.4

0.6

0.8

1 htemp

zvt {zvt>0&&zvt<41&&(mc_pid==8||mc_pid==9)} htemp

Entries 2075 Mean 94.79 RMS 21.57

40 50 60 70 80 90 100 110 120 0 10 20 30 40 50 60 70 80 htemp

zvt {zvt>41&&zvt<120&&(mc_pid==8||mc_pid==9)} htemp

Entries 411 Mean 303.3 RMS 172.3

100 200 300 400 500 600 0 20

40 60 80

100 120 htemp

zvt {zvt>120&&(mc_pid==8||mc_pid==9)}

htemp Entries 772 Mean 4.712 RMS 0.155

3.8 4 4.2 4.4 4.6 4.8 5 0 5 10 15 20 25 30 35 40 ptotus_true {zvt==0&&(mc_pid==8||mc_pid==9)} htemp

Entries 5 Mean 0.933 RMS 0.7256

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 0

0.2

0.4

0.6

0.8

1 htemp

ptotus_true {zvt>0&&zvt<41&&(mc_pid==8||mc_pid==9)} htemp

Entries 2075 Mean 1.144 RMS 0.7842

0 0.5 1 1.5 2 2.5 3 3.5 4 0 10 20 30 40 50 60 70 htemp

ptotus_true {zvt>41&&zvt<120&&(mc_pid==8||mc_pid==9)} htemp

Entries 411 Mean 0.6488 RMS 0.6909

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 5 10 15 20 25 30 35 40 45 htemp

ptotus_true {zvt>120&&(mc_pid==8||mc_pid==9)}

htemp Entries 772 Mean 8 RMS -0

7 7.5 8 8.5 9 0 100 200 300 400 500 600 700 800 mc_pid {zvt==0&&(mc_pid==8||mc_pid==9)} htemp

Entries 5 Mean 8.4 RMS 0.4899

8 8.2 8.4 8.6 8.8 9 0

0.5

1

1.5

2

2.5

3 htemp

mc_pid {zvt>0&&zvt<41&&(mc_pid==8||mc_pid==9)} htemp

Entries 2075 Mean 8.206 RMS 0.4046

8 8.2 8.4 8.6 8.8 9 0 200 400 600 800 1000

1200

1400

1600 htemp

mc_pid {zvt>41&&zvt<120&&(mc_pid==8||mc_pid==9)} htemp

Entries 411 Mean 8.377 RMS 0.4847

8 8.2 8.4 8.6 8.8 9 0

50

100

150

200

250 htemp

mc_pid {zvt>120&&(mc_pid==8||mc_pid==9)}

htemp Entries 96 Mean 8 RMS -0

7 7.5 8 8.5 9 0

20

40

60

80

100 mc_pid {(zvt==0&&(mc_pid==8||mc_pid==9))&&(recosuc==1&&(mc_pid==8||mc_pid==9))} htemp

Entries 1 Mean 8 RMS -0

7 7.5 8 8.5 9 0

0.2

0.4

0.6

0.8

1 htemp

mc_pid {(zvt>0&&zvt<41&&(mc_pid==8||mc_pid==9))&&(recosuc==1&&(mc_pid==8||mc_pid==9))} htemp

Entries 19 Mean 8.105 RMS 0.3069

8 8.2 8.4 8.6 8.8 9 0 2 4 6 8 10 12 14 16 htemp

mc_pid {(zvt>41&&zvt<120&&(mc_pid==8||mc_pid==9))&&(recosuc==1&&(mc_pid==8||mc_pid==9))}

htemp Entries 96 Mean 4.783 RMS 0.4219

4 4.5 5 5.5 6 6.5 7 0

2

4

6

8

10

12 ptotus_reco {(zvt==0&&(mc_pid==8||mc_pid==9))&&(recosuc==1&&(mc_pid==8||mc_pid==9))} htemp

Entries 1 Mean 1.748 RMS -0

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 0

0.2

0.4

0.6

0.8

1 htemp

ptotus_reco {(zvt>0&&zvt<41&&(mc_pid==8||mc_pid==9))&&(recosuc==1&&(mc_pid==8||mc_pid==9))} htemp

Entries 19 Mean 2.141 RMS 0.5787

1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3 3.2 3.4 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 htemp

ptotus_reco {(zvt>41&&zvt<120&&(mc_pid==8||mc_pid==9))&&(recosuc==1&&(mc_pid==8||mc_pid==9))}