htemp Entries 133 Mean 22.2 RMS 11.39

0 5 10 15 20 25 30 35 40 0

1

2

3

4

5 zvt {zvt>0&&zvt<41&&(mc_pid==5||mc_pid==6)} htemp

Entries 134 Mean 68.89 RMS 22.26

40 50 60 70 80 90 100 110 120 0 1 2 3 4 5 6 7 htemp

zvt {zvt>41&&zvt<120&&(mc_pid==5||mc_pid==6)} htemp

Entries 303 Mean 360.5 RMS 143

100 200 300 400 500 600 0 1 2 3 4 5 6 7 8 9 htemp

zvt {zvt>120&&(mc_pid==5||mc_pid==6)}

htemp

Entries 133 Mean 3.275 RMS 0.9024

0 1 2 3 4 5 0

1

2

3

4

5

6 ptotus_true {zvt>0&&zvt<41&&(mc_pid==5||mc_pid==6)} htemp

Entries 134 Mean 1.845 RMS 1.393

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 1 2 3 4 5 6 7 htemp

ptotus_true {zvt>41&&zvt<120&&(mc_pid==5||mc_pid==6)} htemp

Entries 303 Mean 0.6489 RMS 0.8265

0 1 2 3 4 5 0

5

10

15

20

25

30 htemp

ptotus_true {zvt>120&&(mc_pid==5||mc_pid==6)}

htemp

Entries 133 Mean 5.008 RMS 0.08638

5 5.2 5.4 5.6 5.8 6 0 20 40 60 80 100 120

mc_pid {zvt>0&&zvt<41&&(mc_pid==5||mc_pid==6)} htemp

Entries 134 Mean 5.142 RMS 0.3488

5 5.2 5.4 5.6 5.8 6 0

20

40

60

80

100

120 htemp

mc_pid {zvt>41&&zvt<120&&(mc_pid==5||mc_pid==6)} htemp

Entries 303 Mean 5.248 RMS 0.4316

5 5.2 5.4 5.6 5.8 6 0 20 40 60 80 100 120 140 160 180 200 220 htemp

mc_pid {zvt>120&&(mc_pid==5||mc_pid==6)}

htemp Entries 97 Mean 5 RMS -0

4 4.5 5 5.5 6 0

20

40

60

80

100 mc_pid {(zvt>0&&zvt<41&&(mc_pid==5||mc_pid==6))&&(recosuc==1&&(mc_pid==5||mc_pid==6))} htemp

Entries 51 Mean 5.078 RMS 0.2688

5 5.2 5.4 5.6 5.8 6 0 5 10 15 20 25 30 35 40 45 htemp

mc_pid {(zvt>41&&zvt<120&&(mc_pid==5||mc_pid==6))&&(recosuc==1&&(mc_pid==5||mc_pid==6))} htemp

Entries 6 Mean 5 RMS -0

4 4.5 5 5.5 6 0

1

2

3

4

5

6 htemp

mc_pid {(zvt>120&&(mc_pid==5||mc_pid==6))&&(recosuc==1&&(mc_pid==5||mc_pid==6))}

htemp Entries 97 Mean 3.462 RMS 0.821

2 2.5 3 3.5 4 4.5 5 5.5 6 6.5 0

1

2

3

4

5 ptotus_reco {(zvt>0&&zvt<41&&(mc_pid==5||mc_pid==6))&&(recosuc==1&&(mc_pid==5||mc_pid==6))} htemp

Entries 51 Mean 2.999 RMS 1.138

0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0

0.5

1

1.5

2

2.5

3 htemp

ptotus_reco {(zvt>41&&zvt<120&&(mc_pid==5||mc_pid==6))&&(recosuc==1&&(mc_pid==5||mc_pid==6))} htemp

Entries 6 Mean 3.333 RMS 0.976

2 2.5 3 3.5 4 4.5 0

0.2

0.4

0.6

0.8

1 htemp

ptotus_reco {(zvt>120&&(mc_pid==5||mc_pid==6))&&(recosuc==1&&(mc_pid==5||mc_pid==6))}