htemp Entries 772 Mean 0 RMS -0

-1 -0.5 0 0.5 1 0 100 200 300 400 500 600 700 800 zvt {zvt==0} htemp

Entries 138 Mean 22.18 RMS 11.41

0 5 10 15 20 25 30 35 40 0

1

2

3

4

5 htemp

zvt {zvt>0&&zvt<41} htemp

Entries 3245 Mean 98.6 RMS 21.52

40 50 60 70 80 90 100 110 120 0 20 40 60 80 100 120 140 160 180 200 220 htemp

zvt {zvt>41&&zvt<120} htemp

Entries 2117 Mean 312.3 RMS 161.6

100 200 300 400 500 600 0

100

200

300

400

500

600 htemp

zvt {zvt>120}

htemp Entries 772 Mean 4.712 RMS 0.155

3.8 4 4.2 4.4 4.6 4.8 5 0 5 10 15 20 25 30 35 40 ptotus_true {zvt==0} htemp

Entries 138 Mean 3.19 RMS 0.9977

0 1 2 3 4 5 0

1

2

3

4

5

6 htemp

ptotus_true {zvt>0&&zvt<41} htemp Entries 3245 Mean 1.084 RMS 0.8184

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 20 40 60 80 100 120 140 htemp

ptotus_true {zvt>41&&zvt<120} htemp

Entries 2117 Mean 0.4597 RMS 0.5373

0 1 2 3 4 5 0

50

100

150

200

250 htemp

ptotus_true {zvt>120}

htemp Entries 772 Mean 8 RMS -0

7 7.5 8 8.5 9 0 100 200 300 400 500 600 700 800 mc_pid {zvt==0} htemp Entries 138 Mean 5.13 RMS 0.6464

5 5.5 6 6.5 7 7.5 8 8.5 9 0 20 40 60 80 100 120 htemp

mc_pid {zvt>0&&zvt<41} htemp

Entries 3245 Mean 9.448 RMS 3.973

0 10 20 30 40 50 0 200 400 600 800 1000

1200

1400

1600 htemp

mc_pid {zvt>41&&zvt<120} htemp

Entries 2117 Mean 9.59 RMS 8.964

0 10 20 30 40 50 0 100 200 300 400 500 600 700 htemp

mc_pid {zvt>120}

htemp Entries 96 Mean 8 RMS -0

7 7.5 8 8.5 9 0

20

40

60

80

100 mc_pid {(zvt==0)&&(recosuc==1)} htemp

Entries 98 Mean 5.031 RMS 0.3015

5 5.5 6 6.5 7 7.5 8 0

20

40

60

80

100 htemp

mc_pid {(zvt>0&&zvt<41)&&(recosuc==1)} htemp

Entries 71 Mean 6.014 RMS 1.666

6 8 10 12 14 0 5 10 15 20 25 30 35 40 45 htemp

mc_pid {(zvt>41&&zvt<120)&&(recosuc==1)} htemp

Entries 6 Mean 5 RMS -0

4 4.5 5 5.5 6 0

1

2

3

4

5

6 htemp

mc_pid {(zvt>120)&&(recosuc==1)}

htemp Entries 96 Mean 4.783 RMS 0.4219

4 4.5 5 5.5 6 6.5 7 0

2

4

6

8

10

12 ptotus_reco {(zvt==0)&&(recosuc==1)} htemp

Entries 98 Mean 3.444 RMS 0.8347

2 3 4 5 6 0

1

2

3

4

5 htemp

ptotus_reco {(zvt>0&&zvt<41)&&(recosuc==1)} htemp

Entries 71 Mean 2.757 RMS 1.082

0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 0.5 1 1.5 2 2.5 3 3.5 4 htemp

ptotus_reco {(zvt>41&&zvt<120)&&(recosuc==1)} htemp

Entries 6 Mean 3.333 RMS 0.976

2 2.5 3 3.5 4 4.5 0

0.2

0.4

0.6

0.8

1 htemp

ptotus_reco {(zvt>120)&&(recosuc==1)}