htemp

Entries 9 Mean 3.632 RMS 3.27

2 4 6 8 10 12 0

0.5

1

1.5

2

2.5

3 ptotus_reco {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4)} htemp

Entries 9 Mean 238 RMS 77.04

150 200 250 300 350 0

0.2

0.4

0.6

0.8

1 htemp

zvt {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4)}

htemp

Entries 9 Mean 1.868 RMS 3.324

0 2 4 6 8 10 0 0.5 1 1.5 2 2.5 3 3.5 4 ptotus_reco-ptotus_true {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4)}

1.6 1.65 1.7 1.75 1.8 1.85 1.9 1.95

2

4

6

8

10

12 ptotus_reco:ptotus_true {(zvt>120)&&((mc_pid==5||mc_pid==6)&&road_depth==4)}