0 200 400 600 800 1000 1200 1400 1600 1800 2000 2200 0

10000

20000

30000

40000

50000

60000

htemp Nent = 106449 Mean = 162.8 RMS = 323.3

pedestal - adc3 {(pedestal-adc3)>0}_{htemp}

0 2 4 6 8 10 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

htemp Nent = 168682 Mean = 1.693 RMS = 0.7635

rms {rms<10}_{htemp}

0 50 100 150 200 250 300 0 10000

20000

30000

40000

50000

60000

htemp Nent = 103391 Mean = 13.13 RMS = 25.71

vpeak {vpeak>0}_{htemp}

0 50 100 150 200 250 300 0 200 400 600 800 1000

1200

1400

htemp Nent = 16532 Mean = 54.69 RMS = 32.04

qpeak_{htemp}

1 2 3 4 5 6 7 8 9 0 2000

4000

6000

8000

10000

12000

htemp Nent = 16369 Mean = 3.198 RMS = 1.557

cluswid {cluswid<10}_{htemp}

0 2 4 6 8 10 12 14 16 0 10 20 30 40 50 60 70 80 htemp Nent = 92 Mean = 0.7776 RMS = 2.282

massg_{htemp}