0 50 100 150 200 250 300 350 400 0 200 400 600 800 1000

1200

1400

1600

1800 2 x10 htemp Nent = 512088 Mean = 45.43 RMS = 81.59

pedestal - adc3 {abs(pedestal-adc3)<400}_{htemp}

0 2 4 6 8 10 0

10000

20000

30000

40000

50000

htemp Nent = 565298 Mean = 2.064 RMS = 1.087

rms {rms<10}_{htemp}

0 50 100 150 200 250 300 350 0 500 1000

1500

2000

2500

3000

3500

4000 2 x10 htemp Nent = 574541 Mean = 11.65 RMS = 27.03

vpeak {vpeak>0}_{htemp}

0 50 100 150 200 250 300 350 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

htemp Nent = 93419 Mean = 43.15 RMS = 42.55

qpeak_{htemp}

1 2 3 4 5 6 7 8 9 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

htemp Nent = 92622 Mean = 2.324 RMS = 1.117

cluswid {cluswid<10}_{htemp}

0.2113 0.2114 0.2115 0.2116 0.2117 0.2118 0.2119 0

0.5

1

1.5

2

2.5

3 htemp Nent = 8 Mean = 0.2114 RMS = 0.0001996

massg_{htemp}