0 50 100 150 200 250 300 350 400 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

htemp Nent = 216700 Mean = 107.7 RMS = 109

pedestal - adc3 {abs(pedestal-adc3)<400}_{htemp}

0 2 4 6 8 10 0

5000

10000

15000

20000

25000

htemp Nent = 255892 Mean = 2.212 RMS = 1.064

rms {rms<10}_{htemp}

0 50 100 150 200 250 300 0

2000

4000

6000

8000

10000 1 x10 htemp Nent = 257644 Mean = 17.31 RMS = 25.89

vpeak {vpeak>0}_{htemp}

0 50 100 150 200 250 300 0 1000

2000

3000

4000

5000

6000

7000

htemp Nent = 87369 Mean = 34.93 RMS = 32.85

qpeak_{htemp}

1 2 3 4 5 6 7 8 9 0

10000

20000

30000

40000

50000

htemp Nent = 87369 Mean = 2.774 RMS = 0.9727

cluswid {cluswid<10}_{htemp}

0 1 2 3 4 5 6 7 0

100

200

300

400

500

htemp Nent = 603 Mean = 0.4956 RMS = 0.8767

massg_{htemp}