0 200 400 600 800 1000 1200 1400 1600 1800 2000 2200 0 1000

2000

3000

4000

5000

6000

htemp Nent = 11160 Mean = 149.8 RMS = 302.3

pedestal - adc3 {(pedestal-adc3)>0}_{htemp}

0 2 4 6 8 10 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

htemp Nent = 16993 Mean = 1.763 RMS = 0.7581

rms {rms<10}_{htemp}

0 20 40 60 80 100 120 140 160 180 200 220 240 0 1000

2000

3000

4000

5000

6000

htemp Nent = 10854 Mean = 12.09 RMS = 24.23

vpeak {vpeak>0}_{htemp}

0 20 40 60 80 100 120 140 160 180 200 220 240 0 20 40 60 80 100 120 140 htemp Nent = 1659 Mean = 52.66 RMS = 30.44

qpeak_{htemp}

1 2 3 4 5 6 7 8 9 0 200 400 600 800 1000

1200

htemp Nent = 1645 Mean = 3.198 RMS = 1.547

cluswid {cluswid<10}_{htemp}

0.2113080.211310.2113120.2113140.2113160.2113180.211320.2113220.211324 0

0.2

0.4

0.6

0.8

1 htemp Nent = 8 Mean = 0.2113 RMS = 5.017e-06

massg_{htemp}