0 200 400 600 800 1000 1200 1400 1600 1800 2000 2200 0 1000

2000

3000

4000

5000

6000

htemp Nent = 10876 Mean = 98.26 RMS = 238.4

pedestal - adc3 {(pedestal-adc3)>0}_{htemp}

0 2 4 6 8 10 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

htemp Nent = 16719 Mean = 1.748 RMS = 0.7364

rms {rms<10}_{htemp}

0 20 40 60 80 100 120 140 160 180 200 220 240 0 1000

2000

3000

4000

5000

6000

7000

htemp Nent = 10571 Mean = 7.948 RMS = 19.39

vpeak {vpeak>0}_{htemp}

0 20 40 60 80 100 120 140 160 180 200 220 240 0 20 40 60 80 100 120 140 htemp Nent = 1654 Mean = 33.09 RMS = 30.99

qpeak_{htemp}

1 2 3 4 5 6 7 8 9 0

200

400

600

800

1000

htemp Nent = 1640 Mean = 3.034 RMS = 1.615

cluswid {cluswid<10}_{htemp}

0.2113180.211320.2113220.2113240.2113260.2113280.211330.2113320.2113340.211336 0

0.2

0.4

0.6

0.8

1 htemp Nent = 8 Mean = 0.2113 RMS = 6.167e-06

massg_{htemp}