0 200 400 600 800 1000 1200 1400 1600 1800 2000 0 10000

20000

30000

40000

50000

60000

70000

80000

htemp Nent = 87900 Mean = 46.58 RMS = 187.7

pedestal - adc3 {(pedestal-adc3)>0}_{htemp}

0 2 4 6 8 10 0

1000

2000

3000

4000

5000

htemp Nent = 86935 Mean = 2.488 RMS = 1.202

rms {rms<10}_{htemp}

0 20 40 60 80 100 120 140 160 180 200 220 0 10000

20000

30000

40000

50000

60000

70000

80000

htemp Nent = 86370 Mean = 3.811 RMS = 15.67

vpeak {vpeak>0}_{htemp}

0 20 40 60 80 100 120 140 160 180 200 220 0 100 200 300 400 500 600 700

htemp Nent = 4525 Mean = 40.98 RMS = 42.62

qpeak_{htemp}

1 2 3 4 5 6 7 8 9 0 200 400 600 800 1000

1200

1400

1600

1800

2000

htemp Nent = 4487 Mean = 2.312 RMS = 1.118

cluswid {cluswid<10}_{htemp}