0 20 40 60 80 100 0

500

1000

1500

2000

2500

3000 2 x10 htemp Nent = 556759 Mean = 7.817 RMS = 16.6

MuCalibCathode.qstrip {MuCalibCathode.qstrip < 100} htemp

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

200

400

600

800

1000

1200 2 x10 htemp Nent = 570475 Mean = 0.1826 RMS = 0.1552

MuCalibCathode.qrms {MuCalibCathode.qrms<2} htemp

0 0.5 1 1.5 2 2.5 3 3.5 4 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

htemp Nent = 19996 Mean = 0.0022 RMS = 0.05473

MuNumTrack_{htemp}

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5 0

2

4

6

8

10 htemp Nent = 152 Mean = 0.05028 RMS = 0.6955

MuoTracks.px[0]_{htemp}

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0

5

10

15

20

25

htemp Nent = 44 Mean = 0.1818 RMS = 0.9833

MuoTracks.charge_{htemp}

9 10 11 12 13 14 15 16 17 0 2 4 6 8 10 12 14 16 18 htemp Nent = 44 Mean = 14.05 RMS = 1.906

MuoTracks.nhits_{htemp}