0 20 40 60 80 100 0 5000

10000

15000

20000

25000

30000

35000

40000

htemp Nent = 251015 Mean = 14.25 RMS = 17.66

MuCalibCathode.qstrip {MuCalibCathode.qstrip < 100} htemp

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

10000

20000

30000

40000

50000

htemp Nent = 252879 Mean = 0.1791 RMS = 0.1044

MuCalibCathode.qrms {MuCalibCathode.qrms<2} htemp

0 1 2 3 4 5 6 7 0 500 1000

1500

2000

2500

3000

3500

htemp Nent = 5000 Mean = 0.405 RMS = 0.6944

MuNumTrack_{htemp}

-8 -7 -6 -5 -4 -3 -2 -1 0 1 0 50 100 150 200 250 300 350

htemp Nent = 6540 Mean = -0.7494 RMS = 0.7011

MuoTracks.px[0]_{htemp}

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0

200

400

600

800

1000

htemp Nent = 2025 Mean = -0.004444 RMS = 1

MuoTracks.charge_{htemp}

9 10 11 12 13 14 15 16 17 0 200 400 600 800 1000

1200

1400

1600

htemp Nent = 2025 Mean = 15.48 RMS = 1.094

MuoTracks.nhits_{htemp}