-5 0 5 10 15 20 0 10000

20000

30000

40000

50000

60000

70000

80000

htemp Nent = 1493078 Mean = 6.275 RMS = 2.815

pedestal - adc3 {(pedestal-adc3)<5*rms&&abs(pedestal-adc3)<20} htemp

0 2 4 6 8 10 0

2000

4000

6000

8000

10000

1 x10 htemp Nent = 1744883 Mean = 2.478 RMS = 1.19

rms {rms<10}_{htemp}

0 50 100 150 200 250 300 350 400 450 0 200 400 600 800 1000

1200

1400

1600 3 x10 htemp Nent = 1732646 Mean = 4.186 RMS = 16.43

vpeak {vpeak>0}_{htemp}

0 50 100 150 200 250 300 350 0 2000

4000

6000

8000

10000

12000

htemp Nent = 100343 Mean = 40.39 RMS = 42.27

qpeak_{htemp}

1 2 3 4 5 6 7 8 9 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

htemp Nent = 99247 Mean = 2.323 RMS = 1.157

cluswid {cluswid<10} htemp

0.2113 0.2114 0.2115 0.2116 0.2117 0.2118 0.2119 0

0.5

1 1.5

2

2.5 3 htemp Nent = 8 Mean = 0.2114 RMS = 0.0002009

massg_{htemp}