OPERA-2d

Pre and Post-Processor 1.6

15/Nov/01 15:29:33 Page 4

UNITS Length : cm Flux density: gauss Field strength: A m^{-1} Potential : Wb m^{-1} Conductivity: S m^{-1} Source density: A m^{-2} Power : W Force : kgf Energy : J Mass : kg

PROBLEM DATA ntc.st Linear elements Axi-symmetry Modified R*vec pot. Magnetic fields Static solution Scale factor = 1.0 9152 elements 4655 nodes 67 regions

45.0 55.0 65.0 75.0 85.0 95.0 105.0 115.0 125.0

45.0

50.0

55.0

60.0

65.0

70.0

75.0

80.0

85.0

90.0

95.0

100.0

R [cm]

Z [cm]

1 14

43 44

154.955 2685.01 5215.07

Component: BMOD