Station-1 Calib Data

0 200 400 600 800 1000 1200 0 200 400 600 800 1000

1200

1400

1600

1800

2000

oct_avg0 Nent = 1280 Mean x = 648.5 Mean y = 1567 RMS x = 375.2 RMS y = 274.3

rms vs chan, octant-1 oct_avg0_{Nent = 1280}

0 200 400 600 800 1000 1200 0 200 400 600 800 1000

1200

1400

1600

1800

2000

oct_avg1 Nent = 1280 Mean x = 648.5 Mean y = 1796 RMS x = 375.2 RMS y = 64.88

rms vs chan, octant-2^{oct_avg1}_{Nent = 1280Mean x = 648.5}

0 200 400 600 800 1000 1200 0 200 400 600 800 1000

1200

1400

1600

1800

2000

oct_avg2 Nent = 1280 Mean x = 648.5 Mean y = 1805 RMS x = 375.2 RMS y = 57.22

rms vs chan, octant-3^{oct_avg2}Nent = 1280 _{Mean x = 648.5}

0 200 400 600 800 1000 1200 0 200 400 600 800 1000

1200

1400

1600

1800

2000

oct_avg3 Nent = 1280 Mean x = 648.5 Mean y = 1800 RMS x = 375.2 RMS y = 60.53

rms vs chan, octant-4^{oct_avg3}_{Nent = 1280Mean x = 648.5}