0 50 100 150 200 250 0 200 400 600 800 1000

1200

1400

1600

1800

2000

DAC_ADC Nent = 63 Mean x = 91.7 Mean y = 958.3 RMS x = 72.89 RMS y = 575.7

dac vs adc value_{DAC_ADC}