2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 0

5

10

15

20

25

30 g1 Nent = 290 Mean = 3.107 RMS = 0.1254

Reconstructed mass for JPsi events; RMS=2-2-2 g1