2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 0 2 4 6 8 10 12 14 16 18 20 22 g1 Nent = 286 Mean = 3.112 RMS = 0.1377

Reconstructed mass for JPsi events; RMS=2-6-2 g1