0 5 10 15 20 25 30 35 40 0

1000

2000

3000

4000

5000

htemp Nent = 12700 Mean = 2.629 RMS = 8.567

pedestal - adc3 htemp

1 1.5 2 2.5 3 3.5 0 100 200 300 400 500 600 700 800 900 htemp Nent = 12700 Mean = 1.569 RMS = 0.39

rms htemp

0 0.5 1 1.5 2 2.5 3 0 500 1000

1500

2000

2500

3000

3500

4000

4500

htemp Nent = 12700 Mean = 0.1641 RMS = 0.6025

vpeak htemp

2 2.5 3 3.5 4 0

20

40

60

80

100 htemp Nent = 100 Mean = 3.108 RMS = 1.652e-07

qpeak htemp

8 8.5 9 9.5 10 0

20

40

60

80

100 htemp Nent = 100 Mean = 9 RMS = -0

cluswid htemp