0 0.5 1 1.5 2 2.5 3 0 500 1000

1500

2000

2500

3000

3500

4000

4500

htemp Nent = 12700 Mean = 0.1641 RMS = 0.6025

MuCalibCathode.qstrip_{htemp}

0.1 0.15 0.2 0.25 0.3 0 100 200 300 400 500 600 700 800 900 htemp Nent = 12400 Mean = 0.1366 RMS = 0.03148

MuCalibCathode.qrms {MuCalibCathode.qrms<10} htemp

125 125.5 126 126.5 127 127.5 128 128.5 129 0

20

40

60

80

100 htemp Nent = 100 Mean = 127 RMS = -0

MuNumCalibCathode_{htemp}