-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100 h2St1XYDP1 Entries 13 Mean x 8.778 Mean y 3.384 RMS x 16.87 RMS y 12.21

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 h2St1XYDP1

DP Proj. mu+ (X,Y) at St1

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100 h2St2XYDP1 Entries 13 Mean x 42.87 Mean y 4.754 RMS x 35.05 RMS y 22.34

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 h2St2XYDP1

DP Proj. mu+ (X,Y) at St2_{h1pZ1DP}

Entries 13 Mean 37.52 RMS 19.8

0 10 20 30 40 50 60 70 80 90 100 0

0.2

0.4

0.6

0.8

1 h1pZ1DP

DP Trig. pZ (mu+)

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100 h2St1XYDP2_{Entries 13}

Mean x -15.68 Mean y -0.1944 RMS x 21.61 RMS y 12.62

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 h2St1XYDP2

Entries 13

DP Proj. mu- (X,Y) at St1

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100 h2St2XYDP2 Entries 13 Mean x -49.12 Mean y -6.908 RMS x 40.3 RMS y 28.15

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 h2St2XYDP2

DP Proj. mu- (X,Y) at St2_{h1pZ2DP}

Entries 13 Mean 44.35 RMS 14.77

0 10 20 30 40 50 60 70 80 90 100 0

0.2

0.4

0.6

0.8

1 h1pZ2DP

DP Trig. pZ (mu-)