-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100 h2St1XY1_{Entries 3211251}

Mean x 16.97 Mean y 0.474 RMS x 11.1 RMS y 12.43

0

10000

20000

30000

40000

50000 h2St1XY1

Entries 3211251

Proj. mu+ (X,Y) at St1

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100 h2St2XY1_{Entries 3211251}

Mean x 54.39 Mean y -0.8956 RMS x 16.98 RMS y 23.27

0 2000

4000

6000

8000

10000

12000

14000

16000 h2St2XY1

Entries 3211251

Proj. mu+ (X,Y) at St2_{h1pZ1}

Entries 3211251 Mean 41.45 RMS 15.41

0 10 20 30 40 50 60 70 80 90 100 0 10000

20000

30000

40000

50000

60000

70000

80000 h1pZ1

pZ (mu+)

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100 h2St1XY2_{Entries 3211251}

Mean x -15.11 Mean y -0.8563 RMS x 11.64 RMS y 12.29

0 5000

10000

15000

20000

25000

30000

35000

40000 h2St1XY2

Entries 3211251

Proj. mu- (X,Y) at St1

-100 -80 -60 -40 -20 0 20 40 60 80 100

-100 -80 -60 -40 -20 0 20 40 60 80 100 h2St2XY2_{Entries 3211251}

Mean x -51.53 Mean y -3.261 RMS x 19.86 RMS y 23.81

0 1000

2000

3000

4000

5000

6000

7000

8000

9000 h2St2XY2

Entries 3211251

Proj. mu- (X,Y) at St2_{h1pZ2}

Entries 3211251 Mean 38.81 RMS 15.05

0 10 20 30 40 50 60 70 80 90 100 0 10000

20000

30000

40000

50000

60000

70000

80000 h1pZ2

pZ (mu-)