htemp

Entries 139322 Mean 1.514 RMS 1.165

quad

0 0.5 1 1.5 2 2.5 3 3.5 4

26000

28000

30000

32000

34000

36000

38000

40000

quad {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 139322 Mean 9.039 RMS 7.166

fElementID

0 5 10 15 20 25 30 0

2000

4000

6000

8000

10000

12000

14000

16000

fElementID {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 139322 Mean 12.34 RMS 7.84

bElementID

0 10 20 30 40 50 0

2000

4000

6000

8000

10000

12000 htemp_{Entries 139322}

bElementID {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 139322 Mean -1.191 RMS 32.15

fPos

-40 -30 -20 -10 0 10 20 30 40 0

1000

2000

3000

4000

5000

6000

7000

8000

fPos {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 139322 Mean -1.842 RMS 27.62

bPos

-40 -20 0 20 40 0

1000

2000

3000

4000

5000

6000

bPos {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

fElementID

0 5 10 15 20 25 30 fPos

-40

-30

-20

-10

0

10

20

30

40

0

1000

2000

3000

4000

5000

6000

7000

8000

fPos:fElementID {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

bElementID

0 10 20 30 40 50 bPos

-40

-20

0

20

40

0

1000

2000

3000

4000

5000

6000

bPos:bElementID {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 126956 Mean 31.83 RMS 168.2

(1.6-y0)/ty

-400 -200 0 200 400 0

1000

2000

3000

4000

5000

(1.6-y0)/ty {((bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100))&&(abs((1.6-y0)/ty)<500)}

bElementID

0 10 20 30 40 50 fElementID

0

5

10

15

20

25

30

0

500

1000

1500

2000

2500

3000

3500

4000

4500

fElementID:bElementID {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 139322 Mean 9.169 RMS 7.505

fElementID_exp

-10 0 10 20 30 40 0

2000

4000

6000

8000

10000

12000

14000

fElementID_exp {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 139322 Mean 12.96 RMS 7.709

bElementID_exp

0 10 20 30 40 50 0

2000

4000

6000

8000

10000

bElementID_exp {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 139322 Mean 1.972 RMS 29.06

x0 -100 -50 0 50 100 0

2000

4000

6000

8000

10000

x0 {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 139322 Mean 1.83 RMS 4.529

y0 -40 -20 0 20 40 0

2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

y0 {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 139322 Mean -0.005709 RMS 0.05364

tx -0.1 -0.05 0 0.05 0.1 0

1000

2000

3000

4000

5000

6000

tx {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 139322 Mean -0.0008102 RMS 0.02283

ty -0.1 -0.05 0 0.05 0.1 0

1000

2000

3000

4000

5000

6000

7000

8000

9000

ty {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}

htemp

Entries 139322 Mean -0.05086 RMS 4.608

fPos-fPos_exp

-40 -30 -20 -10 0 10 20 30 40

10

2 10

3 10

4 10

5 10

fPos-fPos_exp {(bElementID<100 && fElementID<100 && abs((1.6-y0)/ty)<1000)&&(abs(fPos)<100 && abs(bPos)<100)}