HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.001

0.002

0.003

0.004

0.005

Board4_CH48

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.001

0.002

0.003

0.004

0.005

Board4_CH49

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.001

0.002

0.003

0.004

0.005

Board4_CH50

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

Board4_CH51

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.001

0.002

0.003

0.004

0.005

Board4_CH52

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.001

0.002

0.003

0.004

0.005

Board4_CH53

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

Board4_CH54

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

Board4_CH55

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.001

0.002

0.003

0.004

0.005

Board4_CH56

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

Board4_CH57

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

Board4_CH58

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

Board4_CH59

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

Board4_CH60

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

Board4_CH61

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

Board4_CH62

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

Board4_CH63