HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

Board4_CH32

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

Board4_CH33

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.001

0.002

0.003

0.004

0.005

Board4_CH34

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

Board4_CH35

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

Board4_CH36

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

Board4_CH37

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.0005

0.001

0.0015

0.002

0.0025

0.003

Board4_CH38

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.0005

0.001

0.0015

0.002

0.0025

0.003

Board4_CH39

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

Board4_CH40

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0.001

0.002

0.003

0.004

0.005

0.006

Board4_CH41

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

Board4_CH42

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

Board4_CH43

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

Board4_CH44

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

Board4_CH45

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

Board4_CH46

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.0005

0.001

0.0015

0.002

0.0025

0.003

Board4_CH47