HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH16

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

0.012

Board1_CH17

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH18

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH19

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH20

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH21

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH22

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH23

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH24

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH25

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH26

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH27

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

0.012

Board1_CH28

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

0.012

Board1_CH29

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

Board1_CH30

HV 1500 1600 1700 1800 1900 2000 2100 2200

Hit rate

0

0.002

0.004

0.006

0.008

0.01

0.012

Board1_CH31