0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35

CTEQ4M

NA 51

x d^_ / u^_

Fermilab E866 - Drell-Yan

Α0.032 Systematic error not shown