33 TeV Pb

PHENIX TOF operated at CERN-WA98

5 panels installed in fall of �96

¥Realistic tests of the PHENIX-TOF system in heavy ion beam.

TOF #22nd ARM

158AGeV PbTarget

WA98 :158AGeV Pb+Pbfixed target.

View from Upstream

-0.6-0.4-0.200.20.40.6

050100150200250300Time-of-Flight (27ps/ch)1/p (GeV/c)deuteronprotonK+p+p-K-anti-proton1/p .vs. TOFMomentump< 3.5 GeV/c(|1/p| > 0.28)